noise σ (seed) > 2 cry N 0 5 10 15 20 25 30 35 40

>^e/E_{sc}<E

0.7 0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

< 20 GeV eE < 40 GeV e E≤

20 GeV < 60 GeV e E≤

40 GeV < 80 GeV e E≤

60 GeV 100 GeV

≤ ^e E≤

80 GeV

Barrel