PSF Cut Plots: Jose Cuts

0 0.0050.010.0150.020.0250.03 0 20 40 60 80 100 120 140 Mean = 0.005337 RMS = 0.005273

Gamma err, Jose cuts^{Mean = 0.005337}

0 0.2 0.4 0.6 0.8 1 68% point: 0.0055 95% point: 0.0340