Rec Ntuple Test Plots

0 2 4 6 8 10 12 14 16 18 0 100 200 300 400 500 Mean = 12.3 RMS = 4.351

Conv_Twr_Dist^{Mean = 12.3}_{RMS = 4.351}

0 1 2 3 4 5 6 7 8 9 0 500 1000

1500

2000

2500

3000

3500

4000

4500

Mean = 2.817 RMS = 1.731

fst_Hit_Count^{Mean = 2.817}_{RMS = 1.731}

0 1 2 3 4 5 6 7 8 9 10 0 50 100 150 200 250 300 350 400 450 Mean = 3.389 RMS = 1.861

Surplus_hit_ratio^{Mean = 3.389}_{RMS = 1.861}

0 0.5 1 1.5 2 2.5 3 3.5 4 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

Mean = 1.182 RMS = 1.065

Outside_hit_ratio^{Mean = 1.182}_{RMS = 1.065}

0 5 10 15 20 25 30 35 40 45 50 0 100 200 300 400 500 600 Mean = 17.51 RMS = 11.7

Rec_Sum^{Mean = 17.51}RMS = 11.7

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 50 100 150 200 250 300 350 400 450 Mean = 0.3041 RMS = 0.2184

CsI_Corr_Energy^{Mean = 0.3041}_{RMS = 0.2184}