%
% FPCP 2003
%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  Do not change these:
\textwidth=170mm  \textheight=224mm

\oddsidemargin=0mm
\evensidemargin=0mm
\topmargin=0mm
%%

\def\Title#1{\begin{center} {\Large {\bf #1} } \end{center}}

\def\@aabuffer{}
\def\author #1{\expandafter\def\expandafter\@aabuffer\expandafter
{\@aabuffer \it      #1\relax \par}}
\def\address#1{\expandafter\def\expandafter\@aabuffer\expandafter
{\@aabuffer \small\rm #1\relax 
\par\vspace{1em}}}


\def\makeauthor{
\begin{center}

   \@aabuffer\relax
\end{center} \par
\gdef\@aabuffer{}
\vskip 5mm                      % Vertical space after adress.
}

\def\abstracts#1{
\begin{center}
{\begin{minipage}{150mm}
                 \small
                 \parindent=0pt #1\par
                 \end{minipage}}\end{center}
                 \vskip 10mm \par}  % Vertical space after abstract.

